Title: Basic Health Care Assisting
Course: NAHC TAACCCT Grant

Health Care Assistant Handbook

Thank you for choosing Health Care Assistant.  Please click on the above link to view the HCA manual.  There is a form that must be printed off, signed and turned into one of the instructors.  Following these rules will ensure us to have a great semester.

Ms. Hagan and Ms. Duran