Title: Module Overview
Course: Health Care Math and Science > Section: Learning Modules

In our last module, you will complete the following assignments:

1. Complete the course evaluation. [Instructor will select appropriate course evaluation and post.]
2. Complete the math review.

There are also links to additional materials at the end that will help you better prepare for the GED.