Title: Midterm Exam Information
Course: Lab Instruments II > Section: Midterm: Meeting 8

The midterm exam will cover the content from E1 through E3.

The focus will be on laboratory application of the content with theory at a level appropriate to being a competent technician. Start by reviewing the Prelabs and Lab Procedures first, then quizzes. Then use the PP slides and textbook for those topics you need to review deeper.

The format will be in-class with mostly open-ended questions.