Title: Final Exam Information
Course: Lab Instruments II > Section: Final: Meeting 16

The final exam will primarily cover the content from E4 through E6, but earlier topics will be included where applicable to the content.

The focus will be on laboratory application of the content, including comparing/contrasting the types of spectroscopy and chromatography, with theory at a level appropriate to being a competent technician. Start by reviewing the Prelabs and Lab Procedures first, as well as the PPT slides related to gel electrophoresis, and quizzes. Then use the remaining PPT slides and textbook for those topics you need to review deeper.

The format will be in-class with mostly open-ended questions.