Title: Welcome to LBT 252 - Lab Instruments II
Course: Lab Instruments II > Section: Home Page

Laboratory Instruments II is a continuation of Laboratory Instruments I, an introduction to common laboratory techniques and instruments, delivered in the hybrid format. Most of the scheduled hours for the class will be wet lab hours with the background material being delivered online. Thus you are expected to take responsibility for completing the delivered content/assignments outside of the scheduled class time BEFORE coming to lab.

Each Experiment Set has a number of items associated with it:

- Objectives, Assignments, Experiments– your guide for what to know and what to do in what order, as well as additional notes for each experiment
- PowerPoint lectures and textbook readings - to help you learn the background info; the PP lectures typically include ConceptChecks as a review of major concepts
- Assignments –typically include textbook problems, Discussion Board items and/or worksheets designed to cover one or more module objectives
- Quizzes – assessment of your knowledge over the module objectives
- Prelabs – questions to help prepare you for the wet labs
- Notebook and Lab Reports – based on the laboratory experiments

Please take some time to familiarize yourself with the organization, instructions, and content available to you by exploring the content area links in the navigation menu on the left (organized according to the course schedule in the syllabus).

Be sure to read through the important course documents available in the folder below.

Then when you are ready, go to the E1: Meeting 1,2,3,4 content area, open, print, and read the Objective, Assignments, Experiments file and start doing the items in the included list of Assignments.

Happy Learning!