Title: Lab Instruments I

Home Page
  Welcome to LBT 251 - Lab Instruments I
  Course Syllabus and Rubrics
    Course Syllabus and Calendar
    Laboratory Notebook and Report Rubrics
    Discussion Board Participation Rubric
  Course Outline
  FOR THE INSTRUCTOR
  15 Rules of Netiquette
  Accessibility Statement
  Creative Commons Attribution
  Technical Requirements
Glossary of Terms
  Glossary of Terms
E1: Meeting 1
  Experiment Set 1: Safety, Solutions, Samples, Statistics
  E1 Objectives, Assignments, Experiments
  E1.1 Introduction and Safety
    E1.1 Slides - PowerPoint
    E1.1 Slides - PDF
    Safety Review - Discussion Board Description
    Safety Review - Discussion Board Link
  E1.2 Solution Concentration and Preparation
    E1.2 Slides - PowerPoint
    E1.2 Slides - PDF
    Assignment: E1.2 Solution Concentration and Preparation Calculations
  E1.3 Sampling and Sample Preparation
    E1.3 Slides - PowerPoint
    E1.3 Slides - PDF
    Sample Handling - Discussion Board Description
    Sample Handling - Discussion Board Link
  E1.4 Elementary Statistics
    E1.4 Slides - PowerPoint
    E1.4 Slides - PDF
    Types of Lab Errors - Discussion Board Description
    Types of Lab Errors - Discussion Board Link
  Risk Assessment Tools
    Risk Assessment Tool - Chemical
    Risk Assessment Tool - Process
  E1 Quiz
E2: Meetings 2,3
  Experiment Set 2: Gravimetric Analysis
  E2 Objectives, Assignments, Experiments
  E2 Slides - PowerPoint
  E2 Slides - PDF
  E2 Chemical Alteration of Analyte Calculations
  Assignment: E2 Vocabulary Review
  Assignment: E2 Experiment 4,7 Prelab Questions
  E2 Quiz
E3: Meetings 4,5,6,7
  Experiment Set 3: Titrations
  E3 Objectives, Assignments, Experiments
  E3 Slides - PowerPoint
  E3 Slides - PDF
  E3 Titration Calculations - Practice
  Titration Calculations - Discussion Board Description
  Titration Calculations - Discussion Board Link
  Assignment: E3.1 Experiment 9 Prelab Questions
  Assignment: E3.2 Experiment 10 Prelab Questions
  Assignment: E3.3 Experiment 11 Prelab Questions
  Assignment: E3.4 Experiment 12 Prelab Questions
  E3 Quiz
E4: Meeting 8
  Experiment Set 4: Introduction to Instrumental Analysis
  E4 Objectives, Assignments, Experiments
  E4 Slides - PowerPoint
  E4 Slides - PDF
  LIMS - Discussion Board Description
  LIMS - Discussion Board Link
  E4 Quiz
Midterm: Meeting 9
  Midterm Exam Information
  LBT 251 Midterm Exam
  Survey: Mid-Course
E5: Meetings 10,11
  Experiment Set 5: Electroanalytical Methods
  E5 Objectives, Assignments, Experiments
  E5 Slides - PowerPoint
  E5 Slides - PDF
  Assignment: E5 Vocabulary Review
  Assignment: E5.1 Experiment 46 Prelab Questions
  Assignment: E5.2 Experiment 48 Prelab Questions
  E5 Quiz
E6: Meeting 12
  Experiment Set 6: Introduction to Spectrochemical Methods
  E6 Objectives, Assignments, Experiments
  E6 Slides - PowerPoint
  E6 Slides - PDF
  Assignment: E6 Experiment 14 Prelab Questions
  Refractometry in Practice - Discussion Board Description
  Refractometry in Practice - Discussion Board Link
  E6 Quiz
E7: Meetings 13,14,15
  Experiment Set 7: UV-Vis and IR Spectrometry
  E7 Objectives, Assignments, Experiments
  E7.1 Slides - PowerPoint
  E7.1 Slides - PDF
  E7.2 Slides - PowerPoint
  E7.2 Slides - PDF
  Let the Light Shine! - Discussion Board Description
  Let the Light Shine! - Discussion Board Link
  Assignment: E7.1.A Experiment 7 Prelab Questions
  Assignment: E7.1.B Experiment 8 Prelab Questions
  Assignment: E7.1.C Experiment 19 Prelab Questions
  E7 Quiz
Final: Meeting 16
  Final Exam Information
  LBT 251 Final Exam
  Survey: End of Course