Title: Midterm Exam Information
Course: Lab Instruments I > Section: Midterm: Meeting 9

The midterm exam will cover the content from E1 through E4.

The focus will be on laboratory application of the content, including calculations, with theory at a level appropriate to being a competent technician. Start by reviewing the Prelabs and Lab Procedures first, then the Calculation handouts, Glossary/Vocabulary Reviews, and BlackBoard Quizzes. Then use the PP slides and textbook for those topics you need to review deeper.

The format will be in-class with mostly open-ended questions.