Title: Experiment 6 Quiz
Course: Lab Applications of Microbiology > Section: Course Content

1. Description: Quiz over the Experiment 6 Objectives
2. Force Completion: This test can be saved and resumed later
3. Multiple Attempts: This test allows two attempts. The highest grade will be recorded.

Click Begin to start: Quiz 6. Click Cancel to go back.

You will be previewing this assessment and your results will not be recorded.

Click Begin to start. Click Cancel to quit.

1. Description: Quiz over the Experiment 6 Objectives
2. Force Completion: This test can be saved and resumed later
3. Multiple Attempts: This test allows two attempts. The highest grade will be recorded.

Click Begin to start: Quiz 6. Click Cancel to go back.

You will be previewing this assessment and your results will not be recorded.

Click Begin to start. Click Cancel to quit.

Q: UV light kills microorganisms by:
- Damaging the DNA
- Heating the samples up
- Electrocution
- None of the above
A: Damaging the DNA

Q: UV light is also hazardous to humans.
- True
- False
A: True

Q: You can learn about other method of sterilization and disinfection from:
- The FDA website
- The CDC website
- Both 1 and 2
- None of the above
A: Both 1 and 2

Q: A disadvantage of UV sterilization is:
- It leaves no residue.
- It can be used on liquid samples or solid surfaces.
- It can pose a safety hazard to workers.
- None of the above
A: It can pose a safety hazard to workers.

Q: All microorganisms are equally easy to kill using the same dose of UV light.
- True
- False
A: False