Title: Accessibility Statement
Course: Fundamentals of Laboratory Technology > Section: Home Page

Users may alter formatting of any content to accommodate individual needs. Screen reader compatibility has been verified using Natural Reader 14 (free version) for Windows, Adobe Acrobat DC Read Out Loud, or NVDA version 2016.2.1 (freeware). This course was developed incorporating universal design principles to ensure that it is readily accessible to students and in compliance with the Americans with Disabilities Act and Sections 504 and 508 of the Federal Rehabilitation Act of 1973 as amended.