Title: Lab Safety

Home Page
  Students - Read me first!
  LBT100 Syllabus
  Instructors - Read me first!
  Course Outline
  15 Rules of Netiquette
  Accessibility Statement
  Creative Commons Attribution
  Technical Requirements
Discussion Board
  Discussion Forums
  Discussion Forum Participation Guidelines
  Community Forum Description
  Community Forum Link
Glossary
  Glossary
Day 1
  Objectives for Day 1
  Reading Assignment for Day 1
  Ch 1 Foundations Slides - PowerPoint and PDF
  Ch 1 Regulations Slides - PowerPoint and PDF
  Ch 2 Emergency Response Slides - PowerPoint and PDF
  Safety Quizzes for Day 1
    Ch. 1.1.1 Safety Quiz
    Ch. 1.2.1 Safety Quiz
    Ch. 1.3.1 and 1.3.2 Safety Quiz
    Ch 1.3.3 Safety Quiz
    Ch. 2.1.1 Safety Quiz
    Ch. 2.1.2 Safety Quiz
    Ch. 2.1.3 Safety Quiz
    Ch. 2.1.4 Safety Quiz
    Ch 2.2.2 Safety Quiz
  OSHA Hazard Communication Standard (for your reference)
  OSHA Hazard Communication Standard in full (126 pages)
  OSHA Lab Standard (for your reference)
  OSHA Lab Standard in full (61 pages)
  Discussion Board Description: What do you know about lab safety?
  Discussion Board Link: What do you know about lab safety?
Day 2
  Objectives for Day 2
  Reading Assignment for Day 2
  Ch 3 Laboratory Hazards Slides - PowerPoint and PDF
  Assignment: Exploring Chemical Literature
  Safety Quizzes for Day 2
    Ch. 3.1.1 Safety Quiz
    Ch. 3.1.2 Safety Quiz
    Ch. 3.1.3 Safety Quiz
    Ch. 3.2.1 Safety Quiz
    Ch. 3.2.2 Safety Quiz
    Ch. 3.2.3 Safety Quiz
    Ch. 3.3.1
Day 3
  Objectives for Day 3
  Reading Assignment for Day 3
  Ch 4 Toxic Substances and Biological Agents Slides - PowerPoint and PDF
  Ch 5 Physical Hazards Slides - PowerPoint and PDF
  Safety Quizzes for Day 3
    Ch. 4.1.1 Safety Quiz
    Ch. 4.1.2 Safety Quiz
    Ch. 4.2.1
    Ch. 4.3.1 quiz
    Ch. 4.3.3. quiz
    Ch. 5.1.1 Safety Quiz
    Ch. 5.1.2 Safety Quiz
    Ch. 5.2.1
    Ch. 5.2.2 Quiz
    Ch. 5.2.3 quiz
  Assignment: 5.3 Sections Presentation
  Discussion Board Description: Incident: Fire from frayed electrical wiring
  Discussion Board Link: Incident: Fire from frayed electrical wiring
Day 4
  Objectives for Day 4
  Reading Assignment for Day 4
  Ch 6 Risk Assessments Slides - PowerPoint and PDF
  Safety Quizzes for Day 4
    Ch. 6.1.1 Safety Quiz
    Ch. 6.2.1 quiz
    Ch. 6.2.2 quiz
    Ch. 6.3.3 quiz
  Risk Assessment
    Risk Assessment Tool - Chemical
    Risk Assessment Tool - Process
    Procedure 1 Kinetics
    Procedure 2 pH
    Procedure 3 Dehydration
    Procedure 4 Esterification
    Procedure 5 Cobalt Complex formation
Day 5
  Objectives for Day 5
  Reading Assignment for Day 5
  Ch 7 Risk Management Slides - PowerPoint and PDF
  Ch 8 Chemical Management Slides - PowerPoint and PDF
  Safety Quizzes for Day 5
    Ch. 7.1.1 Safety Quiz
    Ch. 7.1.2 Safety Quiz
    Ch. 7.1.3 Safety Quiz
    Ch. 7.1.4 Safety Quiz
    Ch. 7.2.3
    Ch. 7.3.1
    Ch. 7.3.4 quiz
    Ch. 7.3.7 quiz
    Ch. 8.1.1 quiz
    Ch. 8.2.1
    Ch. 8.3.1
  Discussion Board Description: Now that the class is almost done...
  Discussion Board Link: Now that the class is almost done...
Day 6
  Day 6