Title: 2016FA: IMM-1474-GT01 Fluid Power

Introduction to Course
  Fall 2016 - IMM1474GT01 Fluid Power-2.pdf
Lock Out Tag Out Training
  Lock-Out / Tag-Out 15 Question Test
Principles of Hydraulics
  Homework - Principles of Hydraulics
  Principles of Hydraulics
  Lab #1 - Principles of Hydraulics
Principles of Pneumatics
  Homework - Principles of Pneumatics
  Principles of Pneumatics
  Lab #2 - Principles of Pneumatics
  Test #1
Hydraulic Pumps
  Homework - Hydraulic Pumps
  Hydraulic Pumps
  Lab #3 - Hydraulic Pumps
Compressors
  Compressors
  Homework - Compressors
  Lab #4 - Compressors
Cylinders
  Cylinders
  Homework - Cylinders
  Lab #5 - Cylinders
  Test #2
Motors
  Homework - Motors
  Motors
  Lab #6 - Sequencing
Directional Control
  Homework - Directional Control
  Directional Control
  Lab #7 - Directional Control
Pressure Control
  Homework - Pressure Control
  Pressure Control
  Lab #8 - Pressure Control
Flow Control
  Homework - Flow Control
  Flow Control
  Lab #9 - Flow Control
  Test #3
Ancillary Components
  Ancillary Components
  Homework - Ancillary components
  Lab #10 - Ancillary Components
Electronic Control
  Electronic Control
  Homework - Electronic Control
  Lab #11 - Electronic Control
Troubleshooting
  Homework - Troubleshooting
  Troubleshooting
  Lab #12 - Troubleshooting