Title: Learning Community: Non Conformance Documentation
Course: PW-Course-Import-Test > Section: Module 6: Non Conformance and CAPA

Module 6

Almost all companies have non conformance procedures that detail how soon a non conformance needs to be initiated. Most companies require that a non conformance be initiated within 24 hours of detection of a non conformance. What can happen if a non conformance is documented days later or not at all? Brainstorm some possible consequences.

Write three or four sentences in response to the question and post your answer below.