Title: Final Exam Notes for Instructor-DO NOT PUBLISH
Course: PW-Course-Import-Test > Section: Final Exams

For the objective exam, you will need to give the testing center the authorization code so that they can unlock the test for the student.

Currently the objective exam is set up to pull all the questions from Test Bank A. If the student does not pass the exam, they are allowed one more attempt. When they go to take the test, you must change the settings to pull all the questions from Test Bank B.

For the performance exam, you will need to create a packet and have the following supplies on hand:

- Tools
- At least 3 sets of medical components (each set needs both conforming and non-conforming)
- Red and green totes
- Storage totes

The following are notes for how to grade the criteria in the rubric:

A. The sample size should be appropriate for the given situation and the student should select the samples in a random fashion.  It’s okay for the student to gather more parts than needed, but should not gather fewer parts than needed.

B. Student should follow the following steps: choose the right tool, measuring all components, place parts in the appropriate bin.

C. Fill in inspection form with the measurement information after each measurement. Indicate if inspection meets acceptance criteria by appropriately checking pass or fail on the inspection sheet.

D. The parts selected are such that they have non-conforming parts in them. For this they will have to initiate a non-conformance report and write the non-conformance statement. This statement should have all the required information as described in the non-conformance procedure in the package.