Title: Module 3 Overview
Course: PW-Course-Import-Test > Section: Module 3: Acceptance Criteria

Module 3

Now that we have a basic introduction to quality and good documentation practices, let's learn about acceptance criteria and where to find it. When a quality inspector performs inspection, they are comparing the attributes of that component or part to the acceptance criteria. These are the criteria that a particular component or product has too meet to achieve quality standards. Several different types of inspection techniques may be employed depending on the features on the part to be inspected. There are different tools available to perform these measurements too. We are going to learn about all of this in this module.

 | Competency

After completing this module, you will be able to review specifications to determine acceptance criteria.

 | Learning Objectives

- Define specifications/drawing
- Identify the basic elements of drawings
- Define process monitoring
- Differentiate between Metric and US units of measurement
- Types of measurements
- Identify which inspection tool(s) are required for use by the drawing, if applicable, and why
- Review certificates of conformance

Click Next to move sequentially through the module.