Title: Module 3 Assignments
Course: Canvas Practice Course > Section: Module 3 Resumes and Cover Letters - Applying for the Job

You now have a job for which you would like to apply.  This module will focus on writing a resume and a cover letter for your potential employment.

Module 3 Assignments:  Click on the links below for assignment description.

Your reading assignments will be completed using links in the course modules.  Follow the links using the "Next" button at the bottom of each page to access the reading assigned.

Reading Assignments:   Resumes and Cover Letters, Resume Writing Tips, Cover Letters, Examples of Cover Letters, and Formatting a Business Letter.  These can be found below under Module 3.

Discussion: Discussion #3: Employers using Resume Screening Software  Discussion Module 3 - Employers using Resume Screening Software

Assignment 3-1:  Resume  Assignment 3-1: Resume

Assignment 3-2: Cover Letter  Assignment 3-2: Cover Letter

Quiz:  Take Quiz #3  Quiz #3 - Resumes and Cover Letters