Title: IMPORTANT NOTICE - Requirements and Testing Statements
Course: Special Topics: Ruby on Rails (APT TEMPLATE) > Section: Assignments & Exam

NOTE: Include the following statements in the comments section for each assignment submission:

Comments (to be placed in Bb):

1. Assignment meets requirements. (or state why it does not meet requirements)
2. Assignment passed verificaiton testing to verify that is meets requirements. (or state why it did not pass testing)

Signed: ___(type your name here)____

NOTE: Assignments without the signed statements above in the Blackboard comments section will have 25% deducted.
Making false assertions regarding an academic exercise is a violation of ACC's Academic Dishonesty policy.