Title: Learning Objectives
Course: Personal Computer Help Desk (25366) > Section: Competency Modules

In this chapter, students will be able to:

- Establish major site preparation steps for computer installations
- Determine preinstallation site preparation tasks
- Evaluate the purpose and contents of a site management notebook
- List tools needed to install hardware
- Discuss steps to install and configure hardware, operating systems, networks, and application software
- Describe common installation wrap-up tasks
- Outline ongoing site management tasks