Title: Read it
Course: Personal Computer Hardware > Section: Competencies

1.9 Evaluate and select appropriate components for a custom configuration, to meet customer specifications or needs. | Chapter | Page
Graphic / CAD / CAM design workstation | 31 | 1176
Powerful processor | 31 | 1177
High-end video | 31 | 1177
Maximum RAM | 31 | 1177
Audio / Video editing workstation | 31 | 1178
Specialized audio and video card | 31 | 1178-1179
Large fast hard drive | 31 | 1178
Dual monitors | 31 | 1178-1179
Virtualization workstation | 31 | 1176
Maximum RAM and CPU cores | 31 | 1176
Gaming PC | 31 | 1188
Powerful processor | 31 | 1188
High-end video / specialized GPU | 31 | 1189
Beter sound card | 31 | 1189
High-end cooling | 31 | 1189
Home Theater PC | 31 | 1182
Surround sound audio | 31 | 1183
HDMI output | 31 | 1182
HTPC compact form factor | 31 | 1184
TV tuner | 31 | 1185
Standard thick client | 31 | 1173
Desktop applications | 31 | 1175
Meets recommended requirements for running Windows | 31 | 1173
Thin client | 31 | 1176
Basic applications | 31 | 1176
Meets minimum requirements for running Windows | 31 | 1176
Home Server PC | 31 | 1179
Media streaming | 31 | 1180
File sharing | 31 | 1180
Print sharing | 31 | 1180
Gigabit NIC | 31 | 1182
RAID Array | 31 | 1182