Title: Read it
Course: Personal Computer Hardware > Section: Competencies

Given a scenario, use appropriate command line tools. | Chapter | Pages
Networking |  |
PING | 22 | 840, 842
TRACERT | 22 | 843-844
NETSTAT | 24 | 940
IPCONFIG | 22 | 842
NET | 22 | 857
NSLOOKUP | 22 | 842-843
NBTSTAT | 22 | 857-858
OS |  |
KILL | 15, 19 | 539, 712
BOOTREC | 19 | 696
SHUTDOWN | 18 | 669
TLIST | 15 | 539
MD | 18 | 655-656
RD | 18 | 656-657
CD | 18 | 654-655
DEL | 18 | 663
FDISK | 12 | 380
FORMAT | 18 | 668
COPY | 18 | 663-665
XCOPY | 18 | 665-666
ROBOCOPY | 18 | 666
DISKPART | 19 | 685
SFC | 18 | 668-669
CHKDSK | 18 | 667
[command name] /? | 18 | 652
Recovery console |  |
Fixboot | 19 | 685
Fixmbr | 19 | 685