Title: Read it
Course: Personal Computer Hardware > Section: Competencies

Given a scenario, install and configure the operating system using the most appropriate method. | Chapter | Pages
Boot methods | 14 |
USB | 14 | 485
CD-ROM | 14 | 480, 485
DVD | 14 | 485
PXE | 14 | 500-501
Type of installations |  |
Creating image | 14 | 498
Unattended installation | 14 | 471, 492-497
Upgrade | 14 | 479
Clean install | 14 | 480-491
Repair installation | 19 | 686
Multiboot | 14 | 471
Remote network installation | 14 | 471
Image deployment | 14 | 471
Partitioning | 12 | 375-382, 391-409
Dynamic | 12 | 375-376, 378, 402-407
Basic | 12 | 375-3376, 391-402
Primary | 12 | 376, 377
Extended | 12 | 376, 677-378
Logical | 12 | 377-378
File system types /formatting | 12 | 382-391, 409-410
FAT | 12 | 383-388
FAT32 | 12 | 388-389
NTFS | 12 | 389-391
CDFS | 13 | 439
Quick format vs. full format | 12 | 395
Load alternate third party drivers when necessary | 14 | 480
Workgrooup vs. Domain setup | 5 | 141-147
Time/date/region/language settings | 14 | 482-483
Driver installation, software and Windows updates | 17 | 597-603, 616-618
Factory recovery partition | 12 | 380