Title: Read it
Course: Personal Computer Hardware > Section: Competencies

Perform preventive maintenance procedures using appropriate tools. |  |
Best practices |  |
Schedules backups | 17 | 607-608
Scheduled check disks | 17 | 605, 609
Scheduled defragmentation | 17 | 605, 608-609
Windows updates | 17 | 597-603
Patch management | 17 | 597
Driver/firmware updates | 17, 24 | 615-616, 918
Antivirus updates | 29 | 1129
Tools | 17, 19 |
Backup | 17 | 607-608
System restore | 17 | 632-635
Check disk | 17 | 609
Recovery image | 19 |
Defrag | 12, 17 | 412, 608-609