Title: Learning Objectives
Course: Personal Computer Hardware > Section: Competencies

Given a scenario, install and configure the operating system using the most appropriate method.

Boot methods

USB

CD-ROM

DVD

PXE

Type of installations

Creating image

Unattended installation

Upgrade

Clean install

Repair installation

Multiboot

Remote network installation

Image deployment

Partitioning

Dynamic

Basic

Primary

Extended

Logical

File system types /formatting

FAT

FAT32

NTFS

CDFS

Quick format vs. full format

Load alternate third party drivers when necessary

Workgrooup vs. Domain setup

Time/date/region/language settings

Driver installation, software and Windows updates

Factory recovery partition