Title: Read it
Course: Personal Computer Hardware > Section: Competencies

1.5 Install and configure storage devices and use appropriate media. | Chapter | Page
Optical drives | 13 | 447
CD-ROM | 13 | 437, 447
DVD-ROM | 13 | 437, 447
Blu-Ray | 13 | 435, 447
Combo drives and burners | 13 | 441, 445, 446
CD-RW | 13 | 440, 447
DVD-RW | 13 | 445, 447
Dual Layer DVD-RW | 13 | 437, 447
BD-R | 13 | 445, 447
BD-RE | 13 | 445, 447
Connection types |  |
External | 11 | 337
USB | 11 | 337
Firewire | 11 | 337
eSATA | 11 | 347
Ethernet | 31 | 1182
Internal SATA, IDE SCSI | 11 | 337, 345, 348
IDE configuration and setup (Master, Slave, Cable Select) | 11 | 338, 358-359
SCSI IDs (0-15) | 11 | 350
Hot swappable drives | 11 | 345
Hard drives | 11 | 331
Magnetic | 11 | 331
5400 rpm | 11 | 335
7200 rpm | 11 | 335
10,000 rpm | 11 | 335
15,000 rpm | 11 | 335
Solid state/flash drives | 11, 13 | 336, 433
Compact flash | 13 | 434
SD | 13 | 435
Micro-SD | 13 | 435
Mini-SD | 13 | 435
xD | 13 | 436
SSD | 11 | 336
RAID types | 11 | 354
0 | 11 | 354
1 | 11 | 354
5 | 11 | 354
10 | 11 | 353
Floppy drive | 13 | 429
Tape drive | 17 | 625
Media capacity | 13 | 430, 438, 440, 443-445
CD | 13 | 438
CD-RW | 13 | 440
DVD-RW | 13 | 440
DVD-RW | 13 | 443
Blu-Ray | 13 | 445
Tape | 17 | 625
Floppy | 13 | 430
DL DVD | 13 | 444