Title: Learning Objectives
Course: Personal Computer Hardware > Section: Competencies

Given a scenario, perform printer maintenance.

Laser

Replacing toner, applying maintenance kit, calibration, cleaning

Thermal

Replace paper, clean heating element, remove debris

Impact

Replace ribbon, replace print head, replace paper