Title: Summary
Course: CPS 189: Java Certification - Review, Practice & Prepare (Development) > Section: (OLDstyle) Learning Modules

This unit covers generic types and those provided as part of the Java environment including the List, Set, Queue, and Map interfaces. It also summarizes boxing and unboxing of primitive data types.