Title: Learning Community: Design Control Process
Course: PW-Course-Import-Test > Section: Module 2: Design Controls

As explained in the the Design Control Guidance and depicted in the Mapping the Medical Device Development Process visualizations, the following Design Control requirements exist to assure specific Design Control requirements are satisfied.

Additionally, you can refer back to the videos provided at the beginning of this module for further reinforcement of this material.

For this learning exercise, choose one element of the design process from the following options and describe where it fits in the Design Control lifecycle and why.

- Design Input
- Design Output
- Design Traceability
- Design Review
- Design Transfer