Title: Learning Community: Non-compliance to Quality Records
Course: PW-Course-Import-Test > Section: Module 6: Quality Records

To further reinforce the consequences of non-compliance to Quality Records please perform the following exercise:

Go to the FDA Investigational Database for 2015. Sort the database for all Medical Device observations. Sort through the list to produce a list of the top 5 observations that you feel are directly related to non-compliance to Record requirements. Include the Cite ID, Reference Number and Frequency, and include a short rationale that justifies your selection from the database.  Post your answer in the Learning Community below.