Title: Design Validation and Verification
Course: PW-Course-Import-Test > Section: Module 2: Design Controls

Module 2

As explained in the the Design Control Guidance and depicted in the medical device development process visualizations, Design Verification and Design Validation exist to ensure specific Design Control requirements are satisfied.

Read

Read sections F and G of the Design Control Guidance for more information about these requirements and why they are important.