Title: Lesson 2 To-Do List
Course: WGF 107 DEVELOPMENT > Section: Content

Objective
·        Be able to identify fundamental uses and applications for fixture retrofits and de-lamping

·        Explore the facility potential issues of fixture troubleshooting and why

·        Investigate efficient lighting fixtures, including manufacturers, and how they came to be in facility use

·        State about what I can expect to pay for new fixtures or delamping (both acquisition and operating costs)

·        Assemble how much it costs (or saves) to use either scenario
Prepare | ·        Read – Retrofits and De-lamping
Practice | ·        Read – Troubleshooting, Regulations & Disposal
Practice | ·        Complete and submit the discussion board Introduction Question (5-pts.) ·        Respond to peer’s discussion board question (5-pts.)
Perform | ·        Complete Quiz 5 (20-pts.)
Links/Uploads | Lighting – Chapter 4 (Green Building O&M Manual – Green Seal) http://www.greenseal.org/Portals/0/Documents/IG/PHA%20Manuals/Chapter4_Green_Building_OM_Manual_PHA.pdf Lighting – Chapter 6 (Energy Star® Building Upgrade Manual – U.S. Environmental Protection Agency, 2008 Edition) https://www.energystar.gov/ia/business/EPA_BUM_Full.pdf