Title: Lesson 1 To-Do List
Course: WGF 107 DEVELOPMENT > Section: Content

Objective
- Be able to identify various equipment sensors and their function
- Explore a facility’s uses of various sensors, especially HVAC system components
- Describe delivery and expectations from a HVAC control system as demonstrated on Hampden Model H-MZBM-J2 – Multi-zone Energy Management Trainer
Prepare #1
- Read SCADA
- View “SCADA Tutorial”
- Read ICS
Prepare #2 | - Read The Role of Sensors in Error Proofing
Practice
- Complete and Submit the discussion board Introduction Question;
- Respond to peer’s discussion board question;
Perform | - Complete Lab Activity #4, Worth 25 Points.
Links/Uploads
Hampden H-MZBM-J2 Building Management Trainer:

Operating Instructions Manual (Bulletin 239-10-OI)

MZBM-J2 OI (2).pdf

Experiment Manual (Bulletin 239-10-EX)

MZBM-J2 EX (2).pdf

SCADA Tutorial

http://www.youtube.com/watch?v=tIU_wDVoEVE