Title: Lesson 1 To-Do List
Course: WGF 107 DEVELOPMENT > Section: Content

Title | Lesson 1 To-Do List
Objective
·        Be able to identify and compare a facility lighting management system (specific building O&M) and the ramifications of same at a facility level

·        Explore a facility’s uses of lighting management attributes from a building O&M perspective, and how these assist modify facility occupant behavior

·        Describe how such solid lighting management activities are incorporated in Facility Best Management Practices (BMP)

·        Discuss various interior & exterior lighting capacities, strategies, and O&M practices
Prepare #1 | ·        Read – Initial Lighting Level – Depreciation – Minimal Standards ·        View – (this space intentionally left blank) ·        Read – Fixture and Surface Cleaning - Troubleshooting
Prepare #2 | ·        Read – Lighting Maintenance Requirements ·        View – (this space intentionally left blank) ·        Read – Lamp/Fixture Troubleshooting
Practice | ·        Complete and submit the discussion board Introduction Question (5-pts.) ·        Respond to peer’s discussion board questions (5-pts.)
Perform | ·        Complete Lab Activity #8 (25-pts.)
Links/Uploads | Lighting – Chapter 4 (Green Building O&M Manual – Green Seal) http://www.greenseal.org/Portals/0/Documents/IG/PHA%20Manuals/Chapter4_Green_Building_OM_Manual_PHA.pdf