Title: Lesson 1 To-Do List
Course: WGF 107 DEVELOPMENT > Section: Content

Objective
- Be able to identify and compare a facility waste management system (specific electric safety) and the ramifications of same at a facility level
- Explore a facility’s uses of waste management attributes from a building solid waste perspective, and how these assist modify facility occupant behavior
- Describe how such solid waste management activities are incorporated in Facility Best Management Practices (BMP)
- Discuss various solid waste capacities, strategies, and O&M practices
Prepare #1
- Read –  Electrical Incidents – Main Types & Consequences
- View – Electrical Safety (PowerPoint)
- Read – Three Ways A Person Is Electrically Shocked (typically)
Prepare #2
- Read – Electrical Insulation
- Read – Am I In Danger?
Practice
- Complete and submit the discussion board Introduction Question (5-pts.)
- Respond to peer’s discussion board question (5-pts.)
Perform | - Complete Lab Activity #2 (25-pts.)
Links/Uploads
Occupational Safety and Health Administration (OSHA)

Electric Power  https://www.osha.gov/SLTC/etools/electric_power/index.html

Electrical Safety https://www.osha.gov/dte/grant_materials/fy09/sh-19504-09/electrical_safety.pptx

Electrical Safety Trainer (27-page publication)

https://www.osha.gov/dte/grant_materials/fy07/sh-16586-07/4_electrical_safety_trainer_guide.pdf

Electrical Safety (PowerPoint) https://www.osha.gov/dte/grant_materials/fy09/sh-19504-09/electrical_safety.pptx