Title: AC/DC and Phase Voltage
Course: WGF 107 DEVELOPMENT > Section: Content

Image |
Content
The Advantage of DC systems over the early AC systems.[edit]

During the initial years of electricity distribution, Edison's direct current was the standard for the United States, and Edison did not want to lose all his patent royalties.^[8] Direct current worked well with incandescent lamps, which were the principal load of the day, and with motors. Direct-current systems could be directly used with storage batteries, providing valuable load-leveling and backup power during interruptions of generator operation. Direct-current generators could be easily paralleled, allowing economical operation by using smaller machines during periods of light load and improving reliability. At the introduction of Edison's system, no practical AC motor was available. Edison had invented a meter to allow customers to be billed for energy proportional to consumption, but this meter worked only with direct current. A bipolar open-core power transformer developed by Lucien Gaulard and John Dixon Gibbs was demonstrated in London in 1881, and attracted the interest of Westinghouse. They also exhibited the invention in Turin in 1884. However these early induction coils with open magnetic circuits are inefficient at transferring power to loads. Until about 1880, the paradigm for AC power transmission from a high voltage supply to a low voltage load was a series circuit. Open-core transformers with a ratio near 1:1 were connected with their primaries in series to allow use of a high voltage for transmission while presenting a low voltage to the lamps. The inherent flaw in this method was that turning off a single lamp (or other electric device) affected the voltage supplied to all others on the same circuit. Many adjustable transformer designs were introduced to compensate for this problematic characteristic of the series circuit, including those employing methods of adjusting the core or bypassing the magnetic flux around part of a coil.^[9]
The direct current systems did not have these drawbacks, giving it significant advantages over early AC systems.

Three-phase electric power is a common method of alternating-current electric power generation, transmission, and distribution.^[1] It is a type of polyphase system and is the most common method used by electrical grids worldwide to transfer power. It is also used to power large motors and other heavy loads. A three-phase system is usually more economical than an equivalent single-phase or two-phase system at the same voltage because it uses less conductor material to transmit electrical power.^[2] The three-phase system was independently invented by Galileo Ferraris, Mikhail Dolivo-Dobrovolsky and Nikola Tesla in the late 1880s.
Attributions | Images courtesy of Occupational Safety and Health Administration – U.S. Department of Labor Content courtesy of Wikipedia – The Free Internet Encyclopedia