Title: Unit 8 Glossary
Course: BLD 167 Hazardous Waste Operations and Emergency Response > Section: BLD 167 Hazardous Waste Operations and Emergency Response

Unit 8 Glossary

Terms

Term | Definitions
AC | Alternating Current
Amps | Flow
Bonding | Bonding Current to a Ground.
Conductor | Current Flows.
DC | Direct Current
High Voltage | High Electrical Force
Millie Amps | 1000th of an Amp
Non Conductor | No Current Flows.
OHM | Resistance to flow.
Static Electricity | Can cause Electrocution or shock and be an ignition source.
Volts | Velocity Force
Watts | Volts X Amps