Title: Audio Visual
Course: BLD 167 Hazardous Waste Operations and Emergency Response > Section: BLD 167 Hazardous Waste Operations and Emergency Response

Audio Visual

OSHA: Repair Welder Electrocuted 1 Fatality

By the Department of Labor, OSHA.

Click here if you cannot view the Department of Labor, OSHA video on Repair Welder Electrocuted 1 Fatality.