Title: Unit 4 Assignment
Course: SLF 155 Small Farm Maintenance and Operations > Section: SLF 155 Small Farm Maintenance and Operations

Unit 4 Assignment

Building Mechanical Systems (25 points)

For this assignment, view the following videos and then answer the questions listed below:

1. Watch the “Willamette Egg Farms” video by ABCOregon.

2. Watch the “Swine Farm Video – MN Farm & Food”video by MNfarmandfood .

These videos show several types of building mechanical systems that are part of the daily operations of farm production buildings. After viewing the videos, answer the following questions and submit it to the Dropbox folder found on the course home page:

1. What types of mechanical systems did you see used in the buildings at the Willamette Egg Farms? (Name at least three)

2. Name at least two examples of ventilation methods used in the Swine Farm video.

3. Discuss one example presented in the the videos regarding building design. This example can be any aspect of the buildings in either video.

4. Give your opinion on the videos. What did you like and/or dislike about the subject matter discussed?

5. Name something new you learned from the videos.