Course: SLF 155 Small Farm Maintenance and Operations

Reading & Audio Visual

Hay Storage Building & Grain Storage Building
Hay Storage & Grain Storage Buildings

Hay storage can be separate structures or be a sectioned off part of a bigger equipment barn or building. Hay storage is usually needed for smaller square bales rather than large round bales. It is common practice to bale large round bales wrapped in protective coverings so they can be stored outside, yet still protected from the elements. Hay storage buildings can be made from metal, wood, plastic or steel.

Silos are the most common form of grain storage. Silo preventative maintenance includes checking base for holes and patching them as well as preventing pests such as mice from doing damage to structure.