Title: ENGY 131 Biodiesel Production

ENGY 131 Biodiesel Production
  ENGY 131 Biodiesel Production Introduction
  Student INTAKE Form
  Dropbox
    Dropbox Introduction
  ENGY 131 Biodiesel Production Syllabus.pdf
  Unit 1
    Unit 1 Introduction
    ENGY131 Unit 1 Commentary: What is biodiesel?
    ENGY 131 Unit 1 Homework.pdf
  Unit 2
    Unit 2 Introduction
    Commentary Lesson 2 Diesel Engine Basics
    ENGY131 Unit 2 Homework Assignments.pdf
    Unit 2 Quiz
    Improving Sensors that Monitor Diesel Fuel Quality -- Science Daily.pdf
  Unit 3
    Unit 3 Introduction
    ENGY131 Unit 3 Transesterification Made Simple
    ENGY131 Unit 3 Homework Assignment.pdf
  Unit 4
    Unit 4 Introduction
    ENGY131 Unit 4 Choosing Feedstock
    ENGY131 Unit 4 Homework Assignment.pdf
    Unit 4 Quiz
  Unit 5
    Unit 5 Introduction
    ENGY131 Unit 5 Commentary Catalysis
    ENGY131 Unit 5 Homework Assignment.pdf
  Unit 6
    Unit 6 Introduction
    ENGY131 Commentary Unit 6 Analytical Methods & Fuel Properties
    ENGY131 Unit 6 Homework Assignment.pdf
    Unit 6 Quiz
  Unit 7
    Unit 7 Introduction
    ENGY131 Commentary: Unit 7 Diesel Exhaust Emissions
    ENGY131 Unit 7 Homework Assignment.pdf
  Unit 8
    Unit 8 Introduction
    ENGY131 Unit 8 Commentary: Biodiesel Safety
    ENGY131 Unit 8 Homework Assignment.pdf
  Unit 9
    Unit 9 Introduction
    ENGY131 Unit 9 Commentary: Marine, Jets, Pipelines & Hybrid Biodiesel
    ENGY131 Unit 9 Homework Assignment.pdf
  Unit 10
    Unit 10 Introduction
    ENGY131 Unit 10 Commentary: Biodiesel Production Processes
    ENGY131 Unit 10 Homework Assignment.pdf
    Unit 10 Resources & References
      Unit 10 Resources & References Introduction
      0.InTech-Soybeans_processing_for_biodiesel_production-1.pdf
      1. InTech-Non_edible_oils_raw_materials_for_sustainable_biodiesel-1pdf.pdf
      11. InTech-Production_of_biodiesel_via_in_situ_supercritical_methanol_transesterification-1.pdf
      13, InTech-Alternative_methods_for_fatty_acid_alkyl_esters_production_microwaves_radio_frequency_and_ultrasound.pdf
      16. InTech-Biodiesel_production_with_solid_catalysts-1.pdf
      2.InTech-Biodiesel_production_from_waste_cooking_oil-1.pdf
      3. InTech-Animal_fat_wastes_for_biodiesel_production-3.pdf
      4. InTech-Getting_lipids_for_biodiesel_production_from_oleaginous_fungi.pdf
      5. InTech-Microbial_biodiesel_production_oil_feedstocks_produced_from_microbial_cell_cultivations.pdf
      6. InTech-Algal_biomass_and_biodiesel_production.pdf
      7. InTech-Microalgae_as_feedstocks_for_biodiesel_production.pdf
  Unit 11
    Unit 11 Introduction
    ENGY131 Commentary Lesson 11 Plant Design
    ENGY131 Unit 11 Homework Assignment.pdf
  Unit 12
    Unit 12 Introduction
    ENGY131 Unit 12 Homework Assignment.pdf
  Unit 13
    Unit 13 Introduction
    ENGY131 Lesson13 U.S. Biodiesel Policies
    ENGY131 Unit 13 Homework Assignment.pdf
    Unit 13 Resources & References
      Unit 13 Resources & References Introduction
      1. A Biodiesel Primer/ Market and Public Policy Developments, Quality, Standards & Handling - a-biodiesel-primer-market….pdf
      2. RFS-finalrule copy.pdf
      3. RFS.OverviewIssues.pdf
      4. EPA2012FinalRuleofRFS.pdf
      5. EPA2013BiodieselRequirements.pdf
      6. IntegrationOfBiodieselRINverification.pdf
      7. RFS2 Report Instructions.pdf
  Unit 14
    Unit 14 Introduction
    ENGY131 Unit14 Homework Assignment.pdf
  Unit 15
    Unit 15 Introduction
    Lesson15 Commentary on the Current Status Of the Biodiesel Industry
    ENGY131 Unit 15 Homework Assignment.pdf
    Unit 15 Resources & References
      Unit 15 Resources & References Introduction
      Status of US Biodiesel Production and Trade as of June 24, 2009 - History_on_US_Biodiesel_Mkt_2000-10__Jan..pdf
  ENGY 131 Biodiesel Production Syllabus.pdf