Title: Reading
Course: SGRD 102 Smart Grid Command and Control > Section: SGRD 102 Smart Grid Command and Control

Reading

(1/2)
Microgrids

This report by the Consortium for Electric Reliability Technology Solutions (CERTS), University of Wisconsin-Madison is to describe and explain the Microgrid concept as an advanced
approach for enabling integration of, in principle, an unlimited quantity of distributed energy resources into the electricity grid.

Please make sure to read pages 1-13 of this document.