Course: SGRD 102 Smart Grid Command and Control

Reading

(1/2)
NIST Framework and Roadmap for Smart Grid Interoperability Standards

This is a National Institute of Standards and Technology (NIST) from the U.S. Department of Commerce.  NIST SP 1108
describes standards research in support of its mandate under the Energy Independence and Security Act of 2007 (EISA)..

Read Pages 44-74.