Title: Videos: Preventative Maintenance
Course: CIS 205 Part 3: T&I A+ 802 > Section: Module 1: A+ 802- Operating Systems

 | Videos: Preventative Maintenance

Watch all of the videos on this page.

PACE-IT Video: Maintenance Procedures Best Practices (5:13)

Transcript: Maintenance Procedures Best Practices
Expanded Notes: Maintenance Procedures Best Practices

PACE-IT Slideshare: Maintenance Procedures Best Practices

Pace IT - Maintenance Procedures Best Practices from Pace IT at Edmonds Community College

PACE-IT Video: Preventative Maintenance Tools (6:18)

Transcript: Preventative Maintenance Tools
Expanded Notes: Preventative Maintenance Tools

PACE-IT Slideshare: Maintenance Tools

Professor Messer Videos

Watch the videos listed below by clicking on the links. The links will open in a different window.

Windows Preventive Maintenance
- Preventive Maintenance Best Practices (9:20)
- Preventive Maintenance Tools (4:24)

VIDEO CREDIT

Messer Studios. (2012). Professor Messer's CompTIA 220-801/802 A+ Training.

Click Next to continue.