Title: Read Troubleshooting Competencies
Course: CIS 205 Part 3: T&I A+ 802 > Section: Module 4: A+ 802- Troubleshooting

 | Read Troubleshooting Competencies

This module is designed to teach you the 9 competencies necessary to pass the Troubleshooting Section 4 of the CompTIA A+ 220-802 certification.

At the end of the nine sections, you will complete an assessment that evaluates the competencies you learned in this module. You must score 83% or above to move to the next module.

Module Competency Sections

After completing the nine sections in this module, you will be able to:

1. Given a scenario, explain the troubleshooting theory
2. Given a scenario, troubleshoot common problems related to motherboards, RAM, CPU and power with appropriate tools
3. Given a scenario, troubleshoot hard drives with appropriate tools
4. Given a scenario, troubleshoot  video and display issues
5. Given a scenario, troubleshoot networks with command line prompt and appropriate tools
6. Given a scenario, troubleshoot operating system problems with appropriate tools
7. Given a scenario, troubleshoot common security issues with appropriate tools and best practices
8. Given a scenario, troubleshoot, and repair common laptop issues while adhering to the appropriate procedures
9. Given a scenario, troubleshoot printers with appropriate tools

Click Next to continue.