Title: TestOut LabSim: Client Side Virtualization
Course: CIS 205 Part 3: T&I A+ 802 > Section: Module 1: A+ 802- Operating Systems

 | TestOut LabSim: Client Side Virtualization

1. Login to TestOut LabSim (Links to an external site.),
2. Choose "My Products"
3. Choose "TestOut PC Pro"
4. From the menu, choose and complete the following sections:

- 10.5 Virtualization

Click Next to continue.