Title: Assignment: TestOut LabSim: Power Supply
Course: CIS 205 Part 2: T&I A+ 801

 | TestOut LabSim: Power Supply

1. Login to TestOut LabSim (Links to an external site.),
2. Choose "My Products"
3. Choose "TestOut PC Pro"
4. From the menu, choose and complete the following sections:

- 3.2 Power Supplies
- 6.10 Infrared and Bluetooth

Click Next to continue.