Title: Assignment: TestOut LabSim: Printer Types
Course: CIS 205 Part 2: T&I A+ 801

 | TestOut LabSim: Printer Types

1. Login to TestOut LabSim (Links to an external site.),
2. Choose "My Products"
3. Choose "TestOut PC Pro"
4. From the menu, choose and complete the following section:

- 7.1 Printers

Click Next to continue.