Title: Assignment: TestOut LabSim: CPU Types
Course: CIS 205 Part 2: T&I A+ 801

 | TestOut LabSim: CPU Types

1. Login to TestOut LabSim (Links to an external site.),
2. Choose "My Products"
3. Choose "TestOut PC Pro"
4. From the menu, choose and complete the following sections:

- 3.4 Processors
- 3.10 Cooling

Click Next to continue.