Course: SGRD 103 Metering and Home Area Networks

Exercise 3 (for review)

page 1
Exercise 3 (for review)
This assignment will be available for approximately one week and will need to be submitted after completing Unit 6.
(Instructions on submitting this assignment can be found in Unit 6).
This assignment is worth a total of 30 points.

Click on the file below to download Exercise 3 as a Word document
- SGRD103_Exercise3.doc (65.44 KB)