Course: HET 295 Capstone - Spring 2015

Unit 4 Assignment

Unit 4 Assignment
Unit 4 Assignment

HET 295 Week 4 Assignments

In this course we will be completing a design project where we can learn the importance of proper techniques and how it can eliminate future problems from occurring. Therefore, this week we will determine the Air Flow requirement for the whole house from a blueprint found in the Course Documents section

In the Course Documents section, you will find all the data needed to complete each section of the project.

Turn in you completed Assignment sheets in the Drop Box section for credit.