Title: HET 295 Capstone - Spring 2015

HET 295 Capstone - Spring 2015
  HET 295 Capstone - Spring 2015 Introduction
  Student INTAKE Form
  DropBox
    DropBox Introduction
  Unit 1
    Unit 1 Introduction
    Unit 1 Assignment
    Course Reading List
      Air Flow
      Architectural Drawing
      Architect’s Scale
      Blueprints
      Building Project
      Floor Plans
      HVAC Defined
      Mechanical Systems Drawing
      Multi-view Orthographic Projection
      Ventilation
      Waste Heat
    Course Documents
  Unit 2
    Unit 2 Introduction
    Course Documents
    Course Reading List
      Air Flow
      Architectural Drawing
      Architect’s Scale
      Blueprints
      Building Project
      Floor Plans
      HVAC Defined
      Mechanical Systems Drawing
      Multi-view Orthographic Projection
      Ventilation
      Waste Heat
    Unit 2 Assignment
  Unit 3
    Unit 3 Introduction
    Course Reading List
      Air Flow
      Architectural Drawing
      Architect’s Scale
      Blueprints
      Building Project
      Floor Plans
      HVAC Defined
      Mechanical Systems Drawing
      Multi-view Orthographic Projection
      Ventilation
      Waste Heat
    Unit 3 Assignment
  Unit 4
    Unit 4 Introduction
    Course Documents
    Course Reading List
      Air Flow
      Architectural Drawing
      Architect’s Scale
      Blueprints
      Building Project
      Floor Plans
      HVAC Defined
      Mechanical Systems Drawing
      Multi-view Orthographic Projection
      Ventilation
      Waste Heat
    Unit 4 Assignment
  Unit 5
    Unit 5 Introduction
    Course Documents
    Course Reading List
      Air Flow
      Architectural Drawing
      Architect’s Scale
      Blueprints
      Building Project
      Floor Plans
      HVAC Defined
      Mechanical Systems Drawing
      Multi-view Orthographic Projection
      Ventilation
      Waste Heat
    Unit 5 Assignment
  Unit 6
    Unit 6 Introduction
    Course Documents
    Course Reading List
      Air Flow
      Architectural Drawing
      Architect’s Scale
      Blueprints
      Building Project
      Floor Plans
      HVAC Defined
      Mechanical Systems Drawing
      Multi-view Orthographic Projection
      Ventilation
      Waste Heat
    Unit 6 Assignment
  Unit 7
    Unit 7 Introduction
    Course Documents
    Course Reading List
      Air Flow
      Architectural Drawing
      Architect’s Scale
      Blueprints
      Building Project
      Floor Plans
      HVAC Defined
      Mechanical Systems Drawing
      Multi-view Orthographic Projection
      Ventilation
      Waste Heat
    Unit 7 Assignment
  Unit 8
    Unit 8 Introduction
    Course Documents
    Course Reading List
      Air Flow
      Architectural Drawing
      Architect’s Scale
      Blueprints
      Building Project
      Floor Plans
      HVAC Defined
      Mechanical Systems Drawing
      Multi-view Orthographic Projection
      Ventilation
      Waste Heat
    Unit 8 Assignment