Course: HET 295 Capstone - Spring 2015

Course Documents

page 1
Unit 2 Assignment

HET 293 Week 2 Assignments

Read chapters 3 in Building Code Basics: Residential, Site Preparation and chapter 4, Structural Design Criteria.

·     Discussion: Post a website that adds information to this week’s topic.

·     Post a two paragraph response to my questions for this week’s subject and respond to at least two classmates