Course: HET 290 Building Insulation

Assignment

page 1
Assignment - Blower Door

Blower Door
1. Write a ½ to 1 page document explaining the blower door test procedures.
2. This document should highlight the step-by-step procedure for setting up the blower door, preparing the field house, conducting the blower door test, and returning the field house back to normal.
3. Upload your document to the discussion board when you are finished.
4. Respond to two other documents.