Title: Vocabulary Review
Course: HET 290 Building Insulation > Section: HET 290 Building Insulation

Vocabulary Review

Terms

Term | Definitions
Cold conditions | Working conditions where the ambient air temperature is at or below 50°. This may also include working indoors, such as working in a walking-in freezer.
Hot conditions | Working conditions where the ambient air temperature is at or above 80°. This may also include working indoors, such as working in an attic.
Lock-out-tag-out | Used to secure the power or energy source so work can be performer.
Panel taps | Provide temporary power connection to operate small electrical tools or test equipment.
Personal Safety Protection Equipment | Safety equipment such as safety glasses, respirators, and hearing protection used to protect technicians working in hazards conditionings.
Pressure regulator | Device used to control the pressure of gases coming out of a cylinder.
Refrigeration | The process of transferring heat from one place to a place where it makes little or no difference.
Rotating parts | Gears, pulleys, or fan sheave used to transfer energy from a motor.