Course: GFM 102 Technical Aspects of Energy, Resources & Conservation

Reading

(2/3)
Data Profiles

The following links lead you to readings about creating data profiles built from data on consumption, demand, historical trends and end-user profiles.

Click here to access the Wikipedia page on Data Profiling.
Click here to access How to Submit a Building Profile from Energy Star Program of the Department of Energy.