Course: GFM 102 Technical Aspects of Energy, Resources & Conservation

Reading:Organize Utility and Building Data

(2/2)
Utility Best Practices Guidance for Providing Business Customers with Energy Use and Cost Data

By U.S. Environmental Protection Agency.