Title: Unit 3 Lesson 2 Quiz
Course: GFM 102 Technical Aspects of Energy, Resources & Conservation > Section: GFM 102 Technical Aspects of Energy, Resources & Conservation

Q: Please select the correct answer for each question.

Amount of energy one 100-watt light bulb burning for 10 hours consumes?
- 0.1 kW
- 1 kWh
- 100 watts
- 1,000 watts
A: 1 kWh

Q: Please select the correct answer for each question.

In an energy one 100-watt light bulb burning for 10 hours, what is the energy light bulb “demands”?
- 0.1 kW
- 1 kWh
- 100 watts
- 1,000 watts
A: 100 watts

Q: Please select the correct answer for each question.

Amount of energy ten 100-watt light bulbs burning for 1 hour consumes?
- 0.1 kW
- 1 kWh
- 100 watts
- 1,000 watts
A: 1 kWh

Q: Please select the correct answer for each question.

In ten 100-watt light bulbs burning for 1 hour, what is the "demand"?
- 0.1 kW
- 1 kWh
- 100 watts
- 1,000 watts
A: 1,000 watts

Q: True (T) / False (F) – Key Green Performance Elements & Interrelationships

Electricity prices generally reflect the costs to finance, build, manage, operate and maintain power plants and the complex system of power transmission and distribution lines (grid).
- True
- False
A: True

Q: True (T) / False (F) – Key Green Performance Elements & Interrelationships

In all states, prices for electricity are deregulated by Public Services Commissions.
- True
- False
A: False

Q: True (T) / False (F) – Key Green Performance Elements & Interrelationships

Time-of-use rates are lower when electric demand is higher.
- True
- False
A: False

Q: True (T) / False (F) – Key Green Performance Elements & Interrelationships

“Time-of-use rates” for residential consumers are becoming more and more prevalent since the implementation of “smart-use” meters.
- True
- False
A: True

Q: True (T) / False (F) – Key Green Performance Elements & Interrelationships

Electric utilities are actively seeking public goodwill and cooperation in reducing peak demand.
- True
- False
A: True

Q: True (T) / False (F) – Key Green Performance Elements & Interrelationships

Electric meters do not need monitoring nor service.
- True
- False
A: False