Title: Unit 1 Lessorn 2 Quiz
Course: GFM 102 Technical Aspects of Energy, Resources & Conservation > Section: GFM 102 Technical Aspects of Energy, Resources & Conservation

Q: Select the correct answer for each question.

______ Coal, coke and Breeze
- 43%
- 28%
- 14%
- 11%
- 2%
A: 2%

Q: Select the correct answer for each question.

______ Electricity
- 43%
- 28%
- 14%
- 11%
- 2%
A: 14%

Q: Select the correct answer for each question.

______ Fuel oil
- 43%
- 28%
- 14%
- 11%
- 2%
A: 2%

Q: Select the correct answer for each question.

______ LPG (propane)
- 43%
- 28%
- 14%
- 11%
- 2%
A: 11%

Q: Select the correct answer for each question.

______ Natural gas
- 43%
- 28%
- 14%
- 11%
- 2%
A: 28%

Q: Select the correct answer for each question.

______ Other sources (besides those shown in this unit)
- 43%
- 28%
- 14%
- 11%
- 2%
A: 43%

Q: Select true/false for each statement.

The petroleum refining industry is the largest consumer of energy.
- True
- False
A: True

Q: Select true/false for each statement.

Many energy sources, such as coal and petroleum, are seldom used in manufacturing like ingredients in a recipe.
- True
- False
A: False

Q: Select true/false for each statement.

The amount of energy we use in our homes mainly depends on the climate where we live, and the types and number of energy consuming devices we use.
- True
- False
A: True

Q: Select true/false for each statement.

Rejected energy is defined as energy consumed but unable to do actual work.
- True
- False
A: True