Course: SGRD 100 Smart Grid Overview

Assignment

Unit 5 Assignment
After completing this exercise, you should be able to determine equivalent resistance of series and parallel DC circuits and use a multimeter to measure voltage, current, and resistance.

When you are done with all the problems submit the completed file to the course dropbox.
Click on the item below to download and read about this assignment
- sgrd100.unit5.assignment.pdf (422.24 KB)