Title: Reading Assignment #2
Course: SGRD 100 Smart Grid Overview > Section: SGRD 100 Smart Grid Overview

Reading Assignment #2

Combined Heat and Power: A Clean Energy Solution

This DOE pamphlet describes combined heat and power (CHP) which is cogeneration of electrical and thermal energy from a single fuel source. Benefits of CHP and barriers to CHP deployment are discussed. pamphlet

Click on the item below to download and read about this assignment
- chp_clean_energy_solution.pdf (946.03 KB)