Course: ELT 243 Renewable Energy Systems

Assignment

Assignment

1. Answer the “System Installation and Inspection" section 57104-11 in the textbook Review Questions. (Pages 65-66) Type you're answer on a word document and turn in through the Dropbox in NTER. (20 points)
2. Answer the “Maintenance and Troubleshooting" section 57105-11 in the textbook Review Questions. (Page 20) Type you're answer on a word document and turn in through the Dropbox in NTER. (10 points)