Title: Reading Assignment
Course: ELT 243 Renewable Energy Systems > Section: ELT 243 Renewable Energy Systems

Reading Assignment

Site Assessment

Read "Site Assessment" section 57102-11 in the textbook Solar Photovoltaic Systems Installer on pages 1-27.   The requirement for preforming a PV Site Assessment.