Title: - Lecture
Course: BFM 203 Water Treatment and Control

Overview
- Lecture
  - Pages
    - Introduction to Reservoir Management and Intake Structures
    - Factors Affecting Water Quality
    - Purpose of Reservoir Management Systems
    - Methods of Reservoir Management
    - Aeration and Artificial De-stratification
    - Intake Structures
    - Intake Gates and Valves
    - Safety