Course: BFM 203 Water Treatment and Control

Lecture

(2/9)

10 Attributes of Effective Utilities

- Product Quality
- Employee and Leadership Development
- Financial Viability
- Community Sustainability
- Stakeholder Understanding and Support
- Customer Satisfaction
- Operational Optimization
- Operational Resiliency
- Infrastructure Stability
- Water Resource Adequacy