Course: BFM 203 Water Treatment and Control

Lecture

(1/5)

Introduction to Disinfection

The purpose of disinfection is to destroy harmful organisms, making water safe for consumption; aesthetics and economics are always secondary to providing safe drinking water. Disinfection is necessary because water is a universal solvent and carries many dissolved materials. Water also carries disease-carrying organisms (pathogens).