Course: BFM 203 Water Treatment and Control

Lecture

(3/7)

Quality Control and Quality Assurance in the Laboratory

Equipment used in a water laboratory includes beakers, graduated cylinders, pipettes, burets, and flasks. It is important to select the correct glassware for the required analysis. Laboratory tests are calibrated in either "To Contain (TC)" or "To Deliver (TD)." It is important to select the correct glassware for the required analysis. It is also important to maintain a clean, well-organized laboratory such as that in the photos below. Calibrated instrumentation and adherence to standard analytical procedures ensure consistent and accurate data.