Course: BFM 203 Water Treatment and Control

Lecture

(6/9)

Benefits of Sustainability

TBL and sustainability benefit utilities by 1) helping manage risk, 2) reducing overall operating costs, 3) creating a culture of "demand side management," 4) increasing morale and staff productivity, and 5) increasing positive public relations with the community. Don't overlook the positive effect of sharing with the community the desire to improve overall efficiency.