Title: Unit 11 Lab
Course: BFM 202 Biodiesel Production > Section: BFM 202 Biodiesel Production

Unit 11 Lab

Lab

BFM202 unit 11 – Lab – Cold Soak Filtration Test

Another cold performance test that is run on biodiesel is the Cold Soak Filtration Test. This test will determine if impurities such as phospholipids, sterol glycosides, etc. are present. These impurities can cause problems with filter plugging in cold weather conditions.

Watch this video before coming to the lab
View the presentation prior to coming to the lab.

If you cannot see the video above, click here to open it in a new window.