Course: BFM 202 Biodiesel Production

Unit 13 Lab

Lab

BFM202 unit 13 lab – copper strip corrosion test

The copper strip test measures the relative corrosiveness of a diesel fuel sample by indicating the level of sulfur and other acidic/basic compounds. These compounds would have a corrosive action on various metals such as copper.

.
View the presentation prior to coming to the lab.

If you cannot see the video above, click here to open it in a new window.