Title: unit 14 Lab
Course: BFM 202 Biodiesel Production > Section: BFM 202 Biodiesel Production

unit 14 Lab

Lab

BFM202 unit 14 lab Centrifuge Water and Sediment Test

According to ASTM D2709 specifications, biodiesel must contain <0.050% water and sediment by volume because they can cause problems with fuel line icing and filter plugging. The simple Centrifuge Water and Sediment test can give an indication to how well the separation process was during biodiesel synthesis and washing in 10 minutes.

.
View the presentation prior to coming to the lab.

If you cannot see the video above, click here to open it in a new window.