Title: REEC 220 Solar Thermal Systems

REEC 220 Solar Thermal Systems
  REEC 220 Solar Thermal Systems Introduction
  Introduction
    Introduction Introduction
    Discussion Board
      Introductions
  Unit 1 - Solar Site Assessments
    Unit 1 - Solar Site Assessments Introduction
    Unit 1 Overview
    Videos
      RETScreen Overview Part 1
      RETScreen Overview Part 2
      RETScreen Overview Part 3
      RETSCREEN Overview Part 4
      RETSCREEN Overview Part 5
      RETScreen Somewhere Solar Site Assessment Part 1
      RETScreen Somewhere Solar Site Assessment Part 2
      RETScreen Somewhere Solar Site Assessment part 3
      Solar Pathfinder Demonstration
      Trade Secrets - Solar Hot Water Systems
    Useful Links
      MREA Site Assessment Certificate Program
      RETScreen Software
    Discussion Board
      Investigating a Residential Site
    Unit 1 Quiz
  Unit 2 - Components
    Unit 2 - Components Introduction
    Unit 2 Overview
    Videos
      Components in a Closed Loop System Stiebel Eltron SOLKIT 27 and SOLKIT 25
      Operation of Stiebel Eltron SOL 27 and SOL 25 system
    Useful Links
      Florida Solar Energy Center
      SRCC
    Discussion Board
      Components of a Solar Thermal System
  Unit 3 - System Design
    Unit 3 - System Design Introduction
    Unit 3 Overview
    Videos
      Expansion Tank Video
    Solar Hot Water Heater
      Solar Hot Water Heater
    Discussion Board
      Selecting a System for Central Illinois
  Unit 4 - Load Integration
    Unit 4 - Load Integration Introduction
    Unit 4 Overview
    Solar Water Heater Plumbing
    Discussion Board
      Storage Tank Size
    Unit 4 Quiz
  Unit 5 - Solar Thermal Collectors
    Unit 5 - Solar Thermal Collectors Introduction
    Unit 5 Overview
    Videos
      Description of Operation for SOL 27 and SOL 25
      SOLKIT for SOL 27 and SOL 25
    Useful Links
      Solar Collectors
      Solar Thermal Power Plant
    Discussion Board
      Wind Turbine Siting
    Unit 5 Quiz
  Unit 6 - Tanks and Heat Exchangers
    Unit 6 - Tanks and Heat Exchangers Introduction
    Unit 6 Overview
    Videos
    Stiebel Eltron
      Stiebel Eltron
    Discussion Board
      Your PV System Choice
    Unit 6 Quiz
  Unit 7 - Pumps and Fluids
    Unit 7 - Pumps and Fluids Introduction
    Unit 7 Overview
    Videos
      Glycol Testing Using Refractometer
      pH reading of Solar Thermal Fluid
      Pumps Stiebel Eltron part 1
      Refractometer Operation and Calibrations
      State of Charger Lead Acid Battery Refractometer
      Stiebel Eltron part 2 Static Head Pressure
      Stiebel Eltron part 3 Pump Size
      Stiebel Eltron part 4 Excel Calculations
      Stiebel Eltron part 4a System Pressure Sizing
    Discussion Board
      blackbody radiation
    Unit 7 Quiz
  Unit 8 - Plumbing
    Unit 8 - Plumbing Introduction
    Unit 8 Overview
    Videos
      Soldering Preparation
      Sweat Soldering
    Discussion Board
      Phantom Loads
    Unit 8 Quiz
  Unit 9 - Electricity, Controllers, and Sensors
    Unit 9 - Electricity, Controllers, and Sensors Introduction
    Videos
      Measuring DC part 1
      Measuring AC part 2
      Measuring Resistance part 3
      Measuring Current part 4
    Discussion Board
      Nuclear Energy
    Unit 9 Quiz
  Unit 10 - Putting it All Together
    Unit 10 - Putting it All Together Introduction
    Videos
      Solar thermal System Install Collector Mounting
      Solar thermal System Install Collector Mounting Hands On
      Solar thermal System Install Roof Piping Install
      Solar thermal System Install Roof Piping and Ground Piping
      Solar thermal System Install Collector Feedline Piping
      Solar thermal System Install Collector Return Line Plumbing
      Solar thermal System Install Storage Tank 1
      Solar thermal System Install Storage Tank 2
      Solar thermal System Install Storage Tank 3
      Solar thermal System Install Controller and Sensors 1
      Solar thermal System Install Controller and Sensors 2
      Solar thermal System Install Pumps and Valves
      Solar thermal System Install Pipe Insulation
      Filling Solar Thermal Fluids to Drain/Fill Valves
      Filling Solar Thermal Fluids Purging Air From the Lines
      Filling Solar Thermal Fluids Pressurizing the System
      Armaflex Installation #1
      Armaflex Installation #2 Safety
      Armaflex Installation #3 Installation
      Armaflex Installation #4 Adhesive
      Armaflex Installation #5 Cutting
      Armaflex Installation #7 Templates
    Useful Links
      Florida Solar Energy Center System Installation
    Discussion Board
      Taxation
    Unit 10 Quiz