Title: Unit 10 Quiz
Course: REEC 220 Solar Thermal Systems > Section: REEC 220 Solar Thermal Systems

Q: In order to get a solar thermal system that is certified for the Federal rebate, the system must pass SRCC OG-100 certification.
- True
- False
A: False

Q: List at least three specific tests that the SRCC OG-100 performs.

Q: What are the three main types of collectors in use and certified by SRCC?

Q: SRCC OG-300 certification certifies the collectors in a solar thermal system.
- True
- False
A: False

Q: IAPMO’s Solar Energy Code contain the codes and regulations that most local jurisdictions follow.
- True
- False
A: True

Q: What does AHJ stand for?
- Authority Having Justice
- Authority Handling Junctions
- Authority Having Jurisdiction
A: Authority Having Jurisdiction