Title: M6L3 Quiz
Course: WIND 150WH Wind Turbine Materials and Electro Mechanical Equipment > Section: WIND 150WH Wind Turbine Materials and Electro Mechanical Equipment

Q: Site preparation for larger installations requires additional roadway access and tower area land preparation.
- True
- False
A: True

Q: Some ____________ wind turbines have the rotor assembly constructed on the ground before lifting and attaching it to the nacelle.
- large size
- medium size
- VAWT
- None of the above
A: large size

Q: On some mid-size wind turbines, the entire nacelle and tower can be raised at once with crane.
- True
- False
A: True

Q: Lattice type towers may weigh near ____________.
- 7,000 pounds
- 20 tons
- 100 tons
- 16,000 pounds
A: 7,000 pounds

Q: On larger wind turbines, most of the electrical conversion system is stored within a cabinet at the base and or within the nacelle.
- True
- False
A: True

Q: ___________________ involves looking at what is working correctly first, then looking at what may be the problem and finding
suitable solutions.
- Testing
- Data collecting
- Hypothesizing
- Troubleshooting
A: Troubleshooting

Q: When changing out faulty parts, _________________.
- ensure the part/component is faulty
- ensure that other parts may not have caused damage to that component
- consider the downtime and delays of shipping, etc.
- consider other problems that may arise with swapping the part
- All of the above
A: All of the above

Q: When troubleshooting, a symptom is basically a result of the problem.
- True
- False
A: True

Q: Many symptoms may be direct results of a particular problem.
- True
- False
A: True

Q: Troubleshooting tables offer _________________ and are sometimes provided by ______________.
- symptoms, possible cause/s, & the action required / the manufacturer
- problems, solutions, & tools needed / the maintenance shop
- causes, solutions, & costs / the company
- warrantee information, problems, & repair centers / the manufacturer
A: symptoms, possible cause/s, & the action required / the manufacturer