Course: HET 190 EPA Certification Preparation

Unit 5 Lab

page 1
Connecting and Disconnecting Refrigerant Gauges
The following assignment will be completed and submitted during your time spent in the HVAC lab. Please take this opportunity to download and review the lab assignment. (15 points)

Click on the file below to download the above document
- Connecting and Disconnecting Gauges.pdf (68.46 KB)