Course: HET 190 EPA Certification Preparation

Unit 10 Lab

page 1
Unit 10 Lab
The following assignments will be completed and submitted during your time spent in the HVAC lab. Please take this opportunity to download and review the assignments by clicking on the links below. (15 points)
Click on the files below to download documents associated with this assignment.
- Compressor removal lab.docx (22.91 KB)