Title: Lab Assignment
Course: HET 130 Heating Residential Appliances > Section: HET 130 Heating Residential Appliances

Breadcrumb Navigation

Lab Assignment »

Lab Assignment

page 1
Week 1 Lab Assignment: HVAC Safety

Recommended Materials

1. Personal Protection Equipment (PPE)
2. Extension Ladder and Step Ladder
3. Ear Plugs and Ear Muffs
4. Work Gloves
5. Pressurized Gas Tanks
6. Pressure Regulator
7. First Aid Kit
8. Safety Harness
9. Knee Pads
10. Lock-Out Tag-Out (LOTO) supplies
11. Respirators

Scope

This Lab will help students discover how to recognize safety hazards and to take the proper steps to avoid these hazards.

Procedures

- Locate the supplies that are listed in the Material List.
- Fit yourself with the PPE to check for proper fit.
- Check the Data information on the available ladders and recorded.
- Install the LOTO onto equipment for proper installation.
- Go into a least three Labs and try to locate safety hazards.
- Let the instructor know about any potential safety hazards.

Research Questions

1. What are the procedures in LOTO for a HVAC air-handler?
2. Who will be required to be notified of a LOTO?
3. After you fit yourself for a respirator, did you recognize any potential issues? Why?

Click on the file below to download the Lab Assignment
- HET 130 Wk 1 Lab.docx (15.53 KB)