Title: Reading
Course: HAC 224 Geothermal Systems > Section: HAC 224 Geothermal Systems

Breadcrumb Navigation

Reading »

Reading

Payback

Payback time is the amount of time it takes for a geothermal system to pay for itself.  The following blog article provides more information  about payback for geothermal systems.

Click here and read How to Calculate Payback Time for a Geothermal System blog article.