Course: ENG 120 Technical Composition I

Assignment

Writing Letters

You have received a letter from a customer complaining that his new refrigeration unit is louder than the old one. Write a letter to the customer explaining possible reasons why.

Use Times New Roman 12 to type your assignment. Assignment length: minimum single-spaced one page or less, double-spaced between paragraphs

Once you have completed the assignment go to the Dropbox Folder in the Content Menu and click on "ENG 120 Unit 3: Writing Letters” to learn how to submit the assignment.
Click on the item below to download and read the Assignment
- Writing Letters.docx (13.97 KB)