Title: Care of Patients with Dysrhythmias
Course: NUR 2710C Adult Health Nursing II > Section: Module 1:2 Cardiovascular

Introduction

This module aims to expand the students understanding, knowledge, and practice of care for patients during rhythm disturbances and treatments to include pacemakers, ICD and arrhythmia interpretation.

Objectives

Upon completion of this module, the student will be able to:

Educate patients and families about procedures, interventions for common dysrhythmias and medications. (SLO 2,4)

Analyze an ECG rhythm strip to identify normal sinus rhythm and common life-threatening dysrhythmias. (SLO 2,4)

Explain how to perform emergency care procedures, such as cardiopulmonary resuscitation (CPR) and automated external defibrillation while providing a safe environment for patients and staff. (SLO 2,4)

Standards

This Module maps to the following Standards:

1.    Use effective communication skills appropriate for nursing
2.    Apply clinical judgment in providing care throughout the lifecycle using the nursing process
3.    Demonstrate a commitment to ethical/legal practice and continuous learning for personal and professional growth
4.    Provide competent and safe client care in health care settings
5.    Engage in teaching and learning with clients throughout the lifecycle

Readings & Resources

Care of the Patient with Dysrhythmias

Additional Resources

ECG Tutorial (http://www.youtube.com/watch?v=PQmTBxsrkZE&list=PLMD-UXdKBnDyU5xBstCJaMjnMcWP8vooQ)

Impulses (http://www.youtube.com/watch?v=fUT2r5Tq2Ck)

Arrhythmia (http://www.youtube.com/watch?v=_50jV3DKryQ)

Defibrillator (http://www.youtube.com/watch?v=yhI0eOzuHfU)

Attachments

- winner.jpg