Title: Assignment Lesson 9-1
Course: EMS 1119 Emergency Medical Technician > Section: Module IX Patient Assessment

View the video Multi-Vehicle Intersection Crash (this link will open in a new window).

After viewing answer the following quesitons as they relate to the scene safety, hazards, and mechanism of injury. Write your answers in the order given in a Word (.doc or .docx) file or Rich Text (.rtf) file and upload it to this dropbox. Each answer is worth 5 points.

1. Your EMS unit arrives as "first-in" at this scene. What is yoru first action?
2. Identify the scene hazards.
3. Identify the collision forces involved in this crash and list at least 1 potential injury from each type of force.