Title: Lesson 3-1 Medical Terminology
Course: EMS 1119 Emergency Medical Technician > Section: Module III Medical Terminology

Medical Terminology Applies fundamental knowledge in the use of medical terminology and medical terms

At the end of this lesson and the associated lab activities students will be able to:

Cognitive Learning Objectives

- 3-1.1 Define the medical terminology & medical terms associated with the EMT level.
- 3-1.2 Define a root word
- 3-1.3 Define a combining form.
- 3-1.4 Define a prefix
- 3-1.5 Identify common medical abbreviations.

Affective Objectives

- No affective objectives identified

Psychomotor Objectives

- No psychomotor objectives identified

Readings

- AAOS 10e, Chapter 5
- Limmer 12e, Chapter 5, pp. 93-95

Supplemental Material

- Medical Terminology List
- Medical Abbreviations