Title: Lesson 10-12 Genitourinary/Renal
Course: EMS 1119 Emergency Medical Technician > Section: Module X Medicine

Apply knowledge to provide care for a patient with a genitourinary/renal emergency

At the end of this lesson and the associated lab activities students will be able to:

Cognitive Learning Objectives

- 10-12.1 List the anatomy, physiology & pathophysiology of the renal system
- 10-12.2 Understand the principles of kidney dialysis
- 10-12.3 State the signs and symptoms of a patient with a dialysis emergency
- 10-12.4 Describe the emergency medical care of the patient with a dialysis emergency

Affective Objectives

- No affective objectives identified

Psychomotor Objectives

- 10-12.1 Demonstrate the assessment & medical care of the patient with a dialysis emergency