Course: Materials of Engineering

Module Assignments

- Read chapter 7 from textbook titled "Thermal Behavior"
- View the presentation "Lecture Notes 6"
- Read "Heat Treatment Tensile Strength"
- Be prepared to preform the Lab in class
  - You must write up your lab using Laboratory Report Format  (opens in new window)
  - Turn in your complete Heat Treatment Tensile Strength Labortatory Report before you leave class.