Title: Module 10 Discussion
Course: HIM 2012 Health Law > Section: Module 10 - Risk Management & Quality Review

Watch the following video about this story:  Dennis Quaid Recounts Twins’ Drug Ordeal
http://www.cbsnews.com/news/dennis-quaid-recounts-twins-drug-ordeal/

Discuss what medical error happened in the story?  What should have been done to prevent the error?  Discuss how you would prevent this from happening in the future?