Title: Student Survey - Final
Course: Allied Health Assistant (Phlebotomy)

Q: Was this your first time taking an online course?
- This was my first online course
- I have previously enrolled but not completed an online course
- I have enrolled in more than one online course
A: This was my first online course

Q: The course material was well organized.
- Strongly agree
- Agree
- Disagree
- Strongly disagree
A: Strongly agree

Q: The layout and navigation of the course was
- Excellent
- Good
- Average
- Below average
- Unacceptable
A: Excellent

Q: The effectiveness of the delivery format was
- Excellent
- Good
- Average
- Below average
- Unacceptable
A: Excellent

Q: The design of the course was creative and pleasing to the eye.
- Strongly agree
- Agree
- Disagree
- Strongly agree
A: Strongly agree