Title: Allied Health Assistant (Phlebotomy)

Startup Information
  Questions for the Professor
  Cyber Café
  Student Contract
  Student Contract
Tools & Resources
  Career Advising and Job Placement
  Canvas Help
  Writing Resources
  Library and Learning Commons
  Study Skills and Survival Tips
  Study Skills and Survival Tips
  Netiquette (Online Manners)
  Edison State College - Student Information Station
Module 1
  Overview of Phlebotomy
  Lab Skills Information
  Clinical Information
  Module 1 Case Discussion
  Exam 1
Lab/Clinical
  This is where you will submit the lab and clinical documents
  Bleeding Time Test
  Capillary Skin Puncture
  Syringe Blood Collection
  Venipuncture Collection with a Butterfly Needle
  Venipuncture Collection with an Evacuated Tube System
  Clinical Evaluation
Module 2
  Anatomy and Physiology of the Human Body
  Module 2 Case Discussion
  Exam 2
Module 3
  Phlebotomy Equipment
  Module 3 Case Discussion
Module 4
  Phlebotomy Technique
  Module 4 Case Discussion
  Exam 3
Module 5
  The Challenge of Phlebotomy
  Module 5 Case Discussion
  Exam 4
Module 6
  Sample Considerations and Special Procedures
  Module 6 Case Discussion
  Exam 5
Module 7
  Sample Preparation and Handling
  Module 7 Case Discussion
Module 8
  Customer Service
  Module 8 Case Discussion
  Exam 6
Module 9
  Compliance, Legal and Ethical Issues
  Module 9 Case Discussion
Module 10
  Competency
  Module 10 Case Discussion
  Exam 7
Module 11
  Course Wrap Up
  Final Exam
Instructor Resources
  FOR INSTRUCTOR USE ONLY
  Course Syllabus
  Tutorial | Updating and Uploading your Syllabus (DRAFT)
  Faculty Survey - Midterm
  Faculty Survey - Final
  Student & Faculty Surveys for FRC-TEC
  Course Review Form FRC-TEC.docx
FRC-TEC Surveys
  Student Survey - Midterm
  Student Survey - Final