Title: Capillary Skin Puncture
Course: Allied Health Assistant (Phlebotomy) > Section: Lab/Clinical

Please download the instructions and evaluation documents. These documents are to be filled out by the supervisor after accomplishing the activity and submitted here.  Each activity is worth 20 points.

Capillary Skin Puncture Collection.rtf