Title: Project 2.4: Parts C and D (Optional)
Course: CGS1061: Introduction to Computers > Section: Presentations and Database

This is an OPTIONAL Project

Directions: Using the Internet, school library, your textbook and other resources, complete TWO parts listed below and develop your responses in ONE document. Clearly title each part. For any information that you found in your research, type the name of the resource (web page, book title, etc.) in parenthesis at the end of the information, then create ONE References page for both parts at the end of the document. For examples, see the Syllabus.

Part C: Research and explore the following procedures:

1. identify the components of a Access screen
2. identify and navigate database components
3. create, modify, update data in a database table
4. add and delete fields
5. change field types and properties
6. add, delete, copy and edit records in a table.

Create a listing of the steps or procedures for these tasks providing a short description for each step

Part D: Research and explore the following procedures:

1. create a form using the Form button and using the Form Wizard
2. edit and enter form data
3. sort table data, find and replace data
4. query a database
5. create a report and print a report.

Create a listing of the steps or procedures for these tasks providing a short description for each step