Title: Project 1.1
Course: CGS1061: Introduction to Computers > Section: Computer Systems, Protection and Maintenance

Directions: Using the Internet, school library, your textbook and other resources, complete ALL THREE parts listed below and develop your responses in ONE document. Clearly title each part. For any information that you found in your research, type the name of the resource (web page, book title, etc.) in parenthesis at the end of the information, then create ONE References page for all three parts at the end of the document. For examples, see the Syllabus.

Part A: Research the purchase of a new computer and Develop a list of all the hardware that you would need to build it. You may want to use a website that specializes in computer parts, such as www.newegg.com. Write a two-paragraph description of your system and explain your choices for storage.

Part B: Research power management options for computers and laptops. Write a two-paragraph description of your findings. Explain which option would be best for you and why.

Part C: Research biometrics as an automated methodology for recognizing a person. Create a document listing the advantages and disadvantages of biometrics as a means of authentication, and identify potential security issues. Make a recommendation for the best option to a friend who has sensitive information on their work laptop.

Submission: To submit your file, choose the link titled, Project 1.1, above. Use the "Browse My Computer" button in the Attach File area to attach your document. Be sure to complete your submission by choosing the "Submit" button at the bottom of the screen.

Grading: This Project is worth 20 points toward your final grade and will be graded using the Project Rubric. Please use it as a guide toward successful completion of this lab.