Title: Drilling Down: Logging, Testing and Completing
Course: Open PRO250 Oil & Gas Production I > Section: Week 7: Completions

After reading the assigned chapter, choose a current or local event related the reading in the Chapter of the text.

Action Required

1. First Post:Begin a discussion of the information by posting a 3-5 paragraph summary of the information
2. Peer Response: Then on another day choose the first post of a classmate and discuss the information, your reflections or personal experience. You must reply to at least one post made by another student but let's make sure everyone gets at least one response-thanks!