Title: Cetrifuge System Operation
Course: Open PRO210 Systems > Section: Module 5: Absorption, Stripping, Reactor, and Centrifuge Systems

Use of Synthetic Gypsum from Flue Gas Desulfurization Process

www.youtube.com/watch?v=V4hfH6OqDas

Flue Gas Desulfurization process at Great Plains Synfuels Plant

www.youtube.com/watch?v=5EAx71_94d8