Title: Suggested Drawing Tools
Course: Open EIC225 Programmable Controllers > Section: Module 2: Hardware Components, Number Systems and Codes

Suggested Drawing Tools

- Open Office - download this one-it's like Microsoft Office but FREE! Try Draw or Impress.
- Sketchup (use the free version-download to your computer-this is VERY good!)
- Word or PowerPoint- these work fine, especially PPT
- OR Draw the circuit and submit a picture of your drawing (use your cell phone)
- Google Drawings (in the clouds - good for the basics