Title: Chapter 7 Trade Competency Test
Course: 15/SP Print Read & Weld Symbols (WELD-1650-01) > Section: Assessments

Complete Chapter 7 Trade Competency Test on pages 173-176.

Q: Punch Print #3
A: 55A

Q: Punch Print #7
A: A6

Q: Punch Print #12
- True
- False
A: False

Q: Punch Print #13
- True
- False
A: True

Q: Punch Print #14
- True
- False
A: True

Q: Punch Print #19
- True
- False
A: True

Q: Punch Print #20
- True
- False
A: True

Q: Floor Plate Bracket Print #4
A: A

Q: Floor Plate Bracket Print #8
- True
- False
A: False

Q: Floor Plate Bracket Print #9
- True
- False
A: True

Q: Floor Plate Bracket Print #10
- True
- False
A: False

Q: Support Assembly Print #2
- True
- False
A: True

Q: Support Assembly Print #3
- True
- False
A: False

Q: Support Assembly Print #5

(answer with a number)
A: 3

Q: Support Assembly Print #8

(answer with a number)
A: 4

Q: Support Assembly Print #8
- True
- False
A: False