Title: Description
Course: 14/FA Sustainable Bldg Design (CNTK-1750-01) > Section: Home Page

This course provides students with an understanding of energy efficiency and sustainability as if pertains to
building design.  Emphasis will be place on materials and material usage, energy systems, and location selection to
provide the minimal impacts on the environment.  This course will be web-enhanced by the Amatrol Sustianable building modules: solar concepts, wind concepts and alternative energy through out the course.  The Sustainable building design class is a 3 credit hour course taught 3 days per week.