Title: 15/SP Diesel Electronics (DESL-2010-30)

Home Page
  Course Overview
  DESL2010 Syllabus Spring 2015
  Final Exam Schedule
  Academic Calender
  Power Point Slides
    Chapter 32 Electrical Review PPT
    Chapter 33 Networking, Communications ad Telematics
    Chapter 34 Vehicle Computer Systems
    Chapter 35 EST & SIS
    Chapter 36 Electrical Wiring & Connector Repair
    Chapter 37 Multiplexing
    Chapter 41 Caterpillar Electronic Management Systems
    Chapter 42 Cummins Management Systems
    Chapter 43 Detroit Deisel Electronic Controls
    Chapter 47 Emmisions Management
    Chapter 50 Troubleshooting & Diagnosis
    Cummin QuickServe Online Training
  You Tube Videos
  Helpful web sites
    EPA Clean Diesel
    CAT SIS Login Page
    Cummins Quickserve Login
    Caterpillar
    Cummins
    Detroit Diesel
    Bosch- diesel
Learning Modules
Assessments
Student HelpZone