Title: 15/SP Diesel Essentials (DESL-1595-30)

Home Page
  DESL 1595 Course Overview
  DESL1595 Spring 2015 Syllabus
  Academic Calender
  Final Exam Schedule
  Power Point Slides
    Hand and Shop Tools
  You Tube Videos
    Thread Repair Videos
    Precision Measuring Videos
  Helpfull Websites
    Snap-On Tools
    Matco Tools
    Mac Tools
    Proto Industrial Tools
    Wright Tools
    Ingersollrand
    Fluke
    Gear Wrench
    Vehicle Service Pros
  Hand outs
    Dial Bore Gauge Exercise
    Dial Bore Gauge Exercise #2
Learning Modules
Assessments
Student HelpZone