Title: 14/FA Diesel Engines (DESL-1600-31)

Home Page
  DESL 1600 Basic Engines Course Overview
  DESL 1600 31 Diesel Engines Syllabus
  Powerpoints
    Chapter 1 Introduction
    Chapter 2 Tools
    Chapter 3 Safety
    Chapter 4 Engine Basics
    Chapter 5 History
    Chapter 6 Power
    Chapter 7 Powertrain
    Chapter 8 Engine Feedback Assembly
    Chapter 9 Engine Housing Components
    Chapter 10 Lube Systems
    Chapter 11 Cooling Systems
    Chapter 12 Engine Breathing
    Chapter 13 Retarders
    Chapter 14 Servicing and Maintenance
    Chapter 15 Engine Removal and Assembly
    Chapter 16 Engine Run-In
  Handouts
    Work order
    Example service sheet
    60 series parts list
    Repair order
    855 cummins engine stand
  Videos
    Engine Operation
    Engine Blocks
    Valve train Components Camshafts, Valves, and Timing
    Running Gear (Piston, Connecting Rods, and Crankshaft)
    Lubrication Systems
    Cooling Systems
    Induction and Exhaust
    Preventative Maintenance
    Dynomometer testing and Engine Braking
Assessments
Learning Modules
Student HelpZone